\input{mmd-article-header}
\def\mytitle{MultiMarkdown Citation Test}
\def\bibliocommand{\bibliography{fake}}
\input{mmd-article-begin-doc}

\part{Citations}
\label{citations}

This is a test of citations~\citep{first} for\footnote{A footnote for good measure.} MultiMarkdown~\citep{second}.

And an unlisted citation.~\citep{Author:1988}.

And now some repeats{\ldots}\footnote{And another footnote}

This is a test of citations~\citep[p. 123]{first} for MultiMarkdown~\citep{second}.

And an unlisted citation~\citep{Author:1988}.

Unlisted with locator.~\citep[test]{Author:1988}

Empty locator.~\citep{first}

Consecutive citations.~\citep{first}~\citep{second}

Consecutive citations.~\citep{first}~\citep{second}

An ``improperly'' formed citation.~\citep{second}

And an ``improper'' sequence.~\citep{first}~\citep{second}

~\nocite{third}

\begin{thebibliography}{0}

\bibitem{first}
John Doe. \emph{A Totally Fake Book}. Vanity Press, 2006.

\bibitem{second}
Jane Doe. \emph{Another Totally Fake Book}. Vanity Press, 2008.

\bibitem{third}
Jim Doe. \emph{Yet Another Fake Book}. Vanity Press, 2010.

\end{thebibliography}

\input{mmd-memoir-footer}

\end{document}
